From 9778695b4ad1fd999eb79b01c768a2f2b9938917 Mon Sep 17 00:00:00 2001
From: fragosti <francesco.agosti93@gmail.com>
Date: Mon, 4 Jun 2018 19:48:21 -0700
Subject: Try enabling no-unused-variable...

---
 packages/website/ts/components/ui/etherscan_icon.tsx | 1 -
 1 file changed, 1 deletion(-)

(limited to 'packages/website/ts/components/ui/etherscan_icon.tsx')

diff --git a/packages/website/ts/components/ui/etherscan_icon.tsx b/packages/website/ts/components/ui/etherscan_icon.tsx
index 1b032c112..0beb69123 100644
--- a/packages/website/ts/components/ui/etherscan_icon.tsx
+++ b/packages/website/ts/components/ui/etherscan_icon.tsx
@@ -2,7 +2,6 @@ import { colors, EtherscanLinkSuffixes, utils as sharedUtils } from '@0xproject/
 import * as _ from 'lodash';
 import * as React from 'react';
 import ReactTooltip = require('react-tooltip');
-import { utils } from 'ts/utils/utils';
 
 interface EtherScanIconProps {
     addressOrTxHash: string;
-- 
cgit v1.2.3

