From e34b0af25133629ad4c177c4d7d5050bd6ac19b8 Mon Sep 17 00:00:00 2001
From: Leonid Logvinov <logvinov.leon@gmail.com>
Date: Wed, 10 Jan 2018 12:39:37 +0100
Subject: Fix ts error in portal after enabling more strict checks

---
 packages/website/ts/components/fill_warning_dialog.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/website/ts/components/fill_warning_dialog.tsx')

diff --git a/packages/website/ts/components/fill_warning_dialog.tsx b/packages/website/ts/components/fill_warning_dialog.tsx
index 38c10870b..165d21b34 100644
--- a/packages/website/ts/components/fill_warning_dialog.tsx
+++ b/packages/website/ts/components/fill_warning_dialog.tsx
@@ -5,7 +5,7 @@ import { colors } from 'ts/utils/colors';
 
 interface FillWarningDialogProps {
     isOpen: boolean;
-    onToggleDialog: () => void;
+    onToggleDialog: (didUserCancel: boolean) => void;
 }
 
 export function FillWarningDialog(props: FillWarningDialogProps) {
-- 
cgit v1.2.3

