From 316f3e2e766c325bc56260ceb00c1e7a7175adf1 Mon Sep 17 00:00:00 2001
From: fragosti <francesco.agosti93@gmail.com>
Date: Thu, 8 Nov 2018 15:04:03 -0800
Subject: fix: token selector scrolling container height

---
 packages/instant/src/components/sliding_panel.tsx | 4 +++-
 1 file changed, 3 insertions(+), 1 deletion(-)

(limited to 'packages/instant/src/components/sliding_panel.tsx')

diff --git a/packages/instant/src/components/sliding_panel.tsx b/packages/instant/src/components/sliding_panel.tsx
index 7ef28e09c..5e8a73663 100644
--- a/packages/instant/src/components/sliding_panel.tsx
+++ b/packages/instant/src/components/sliding_panel.tsx
@@ -30,7 +30,9 @@ export const Panel: React.StatelessComponent<PanelProps> = ({ title, children, o
                 <Icon width={12} color={ColorOption.lightGrey} icon="closeX" onClick={onClose} />
             </Container>
         </Flex>
-        <Container marginTop="10px">{children}</Container>
+        <Container marginTop="10px" height="100%">
+            {children}
+        </Container>
     </Container>
 );
 
-- 
cgit v1.2.3

