From d85daab96700dc77cd55f5b97c1e290a95ef20a4 Mon Sep 17 00:00:00 2001
From: Fabio Berger <me@fabioberger.com>
Date: Sat, 13 Oct 2018 17:09:46 +0100
Subject: fix: Dropdown component so that re-clicking the activeNode when
 dropdown is open, closes it

---
 packages/website/ts/components/ui/drop_down.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/website/ts/components/ui/drop_down.tsx')

diff --git a/packages/website/ts/components/ui/drop_down.tsx b/packages/website/ts/components/ui/drop_down.tsx
index 9044b218d..4138b3fe5 100644
--- a/packages/website/ts/components/ui/drop_down.tsx
+++ b/packages/website/ts/components/ui/drop_down.tsx
@@ -100,7 +100,7 @@ export class DropDown extends React.Component<DropDownProps, DropDownState> {
     private _onActiveNodeClick(event: React.FormEvent<HTMLInputElement>): void {
         if (this.props.activateEvent === DropdownMouseEvent.Click) {
             this.setState({
-                isDropDownOpen: true,
+                isDropDownOpen: !this.state.isDropDownOpen,
                 anchorEl: event.currentTarget,
             });
         }
-- 
cgit v1.2.3

