From 97312c265666b3f3f955c096de5aba8791329d79 Mon Sep 17 00:00:00 2001
From: fragosti <francesco.agosti93@gmail.com>
Date: Thu, 5 Jul 2018 11:45:54 -0700
Subject: Use default networkId of 1 for ledger dropdown

---
 packages/website/ts/components/dialogs/ledger_config_dialog.tsx | 5 ++++-
 1 file changed, 4 insertions(+), 1 deletion(-)

(limited to 'packages/website/ts/components/dialogs/ledger_config_dialog.tsx')

diff --git a/packages/website/ts/components/dialogs/ledger_config_dialog.tsx b/packages/website/ts/components/dialogs/ledger_config_dialog.tsx
index 38e4732a4..d2f373d67 100644
--- a/packages/website/ts/components/dialogs/ledger_config_dialog.tsx
+++ b/packages/website/ts/components/dialogs/ledger_config_dialog.tsx
@@ -29,7 +29,7 @@ interface LedgerConfigDialogProps {
     toggleDialogFn: (isOpen: boolean) => void;
     dispatcher: Dispatcher;
     blockchain: Blockchain;
-    networkId: number;
+    networkId?: number;
     providerType: ProviderType;
 }
 
@@ -44,6 +44,9 @@ interface LedgerConfigDialogState {
 }
 
 export class LedgerConfigDialog extends React.Component<LedgerConfigDialogProps, LedgerConfigDialogState> {
+    public static defaultProps = {
+        networkId: 1,
+    };
     constructor(props: LedgerConfigDialogProps) {
         super(props);
         const derivationPathIfExists = props.blockchain.getLedgerDerivationPathIfExists();
-- 
cgit v1.2.3

